; This Source Code Form is subject to the terms of the Mozilla Public
; License, v. 2.0. If a copy of the MPL was not distributed with this
; file, You can obtain one at http://mozilla.org/MPL/2.0/.

LIBRARY mozglue.dll

EXPORTS
  ; symbols that are actually useful
  malloc=je_malloc
  calloc=je_calloc
  realloc=je_realloc
  free=je_free
  posix_memalign=je_posix_memalign
  malloc_usable_size=je_malloc_usable_size
  malloc_good_size=je_malloc_good_size
  _aligned_free=je_free
  _aligned_malloc=wrap__aligned_malloc
  strndup=wrap_strndup
  strdup=wrap_strdup
  _strdup=wrap_strdup
  wcsdup=wrap_wcsdup
  _wcsdup=wrap_wcsdup
